Cannes Bra

Vendor: TITIKA Active Couture
Type: Bras
Price: 94.00

What You Should Know

Wanna find a perfect medium impact sports bra while looking sexy? The Cannes Bra is designed to be breathable, functional and stylish for all sports and everyday wear. Show off your spheroid with the special hollow back design. Match it with any earth tone bottoms and keep yourself low-key while unique. Don't miss adding this classic piece into your wardrobe.

Functions

breathable

quick dry

moisture wicking

removable built-in bra pads

extra stretch

medium-high support

Fabric

72.8% nylon

27.2% spandex

Size and Fit

The model is 5' 8" and wearing a size 2

Washing Instructions

hand wash maximum temperature 40℃

do not bleach

iron at maximum temperature 110℃

do not dry wash