Strapping Bra

Vendor: TITIKA Active Couture
Type: Bras
Price: 91.00

What You Should Know

This low-impact bra is as unique as you are. With four-strap detailing to keep you supported, and an open back for breathable room, our Strapping Bra won’t hold you back.

Functions

breathable

moisture wicking

4-way stretch

UV protection

quick dry

removable cups

Fabric

83% nylon

17% lycra

Size and Fit

light impact

moderate stretch

moderate thickness

The model is 5' 8" and wearing a size 2

Washing Instructions

max temp 30C, do not bleach, do not dry clean, do not iron